-- Add wall_height column to roof_geometry table
-- Run this SQL to enable wall height storage

USE tilbudgivern;

-- Add wall_height column if it doesn't exist
ALTER TABLE roof_geometry ADD COLUMN IF NOT EXISTS wall_height DECIMAL(10,2) DEFAULT 0.0 COMMENT 'Wall height in meters';

-- Verify the column was added
DESCRIBE roof_geometry;